         180           3
  -21.4725229078002       -23.1765693120996       -24.8042850873056     
   8.47525862942373        9.29912754653373        9.05592413047903     
  5.168954637457649E-003  0.000000000000000E+000
  0.986852868475099       0.000000000000000E+000
  0.983999381017231       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
