         180           8
   6.18619060260121        6.07694366452824        6.06717145479385     
   6.00929397574138        6.08304619699606        6.01433645504820     
   5.89586308909155        6.00912513823097     
  -9.35087322400541       -9.70689352255190       -10.1934073226041     
  -10.4997019592118       -11.0031693594346       -11.8530020995484     
  -12.5427079720458       -12.6894979635836     
 -2.194772625970563E-002  0.000000000000000E+000
   1.00830998614934       0.000000000000000E+000
   1.01505871504280       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
