         180           8
  -15.7554770908707       -16.1993944926526       -16.7484611837665     
  -17.3179628926331       -17.7602011992910       -18.2433267061333     
  -18.6375375247629       -19.1508968331955     
   6.98651489989483        6.90323243902935        6.98338120008615     
   7.05639611686476        7.19715428917068        7.29082616230035     
   7.34834899563083        7.35328607603912     
  4.672512939189427E-003  0.000000000000000E+000
  0.987491194239531       0.000000000000000E+000
  0.984866581753888       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
