         180           8
   9.70158105555863        9.25202951089574        8.85148346400925     
   8.34896958379461        7.89173957024480        7.50220995570600     
   7.09801253466804        6.82453816840377     
   25.0035535176349        24.8946470749817        24.8523661468294     
   24.8360738314555        24.8200547415995        24.6989310278647     
   24.5616055749594        24.3707324765985     
 -2.347090922907077E-002  0.000000000000000E+000
   1.00973642977345       0.000000000000000E+000
   1.01661036500047       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
