         180           3
  -23.3744510046880       -21.4221712445924       -19.3826126989902     
   2.07338411331420        3.29437606530652        4.71228848066157     
  4.998247778395563E-003  0.000000000000000E+000
  0.987578404224784       0.000000000000000E+000
  0.984801525493011       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
