         180           8
   8.47205622223496        8.30936402528674        8.17671574700971     
   8.10691440182550        8.08678605017119        8.08953056959065     
   8.10780695241007        8.10010761047696     
   19.3913179847932        20.2980447978626        20.5419732747199     
   20.9206430422044        21.3316091827273        21.7168930664172     
   22.1376690191408        22.4982594466675     
 -2.325943197903654E-002  0.000000000000000E+000
   1.01030546613324       0.000000000000000E+000
   1.01554074691285       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
