         180           3
  -24.0614464721159       -22.7633666418705       -22.6727261931985     
  8.310143337704999E-002   3.78347050049905        10.7643803084775     
  5.287705427616393E-003  0.000000000000000E+000
  0.987854032715881       0.000000000000000E+000
  0.985133232370405       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
