         180           3
  -16.7431265080075       -18.7938488610061       -20.8309579685922     
   3.90982567191780        3.05974755918007        3.06416957405076     
  5.188406664445619E-003  0.000000000000000E+000
  0.987675799382779       0.000000000000000E+000
  0.985049320397481       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
