         180           8
   12.5237753740301        11.9705153744956        11.3177944122874     
   10.6779114721143        10.0631605533113        9.46168343198207     
   8.88771118935366        8.35163445639341     
   4.75224981888689        4.46285899449274        4.26080761048637     
   4.04441249575302        3.82733086433862        3.65151264330743     
   3.48216588057816        3.33509131006432     
 -2.017983401815037E-002  0.000000000000000E+000
   1.00962835469590       0.000000000000000E+000
   1.01556222712920       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
