         180           3
  -15.9699418663004       -17.7923683761848       -20.2002653860506     
   1.33629787343114       0.315917525120544      -0.107777641742105     
  5.611569177481237E-003  0.000000000000000E+000
  0.988571483522640       0.000000000000000E+000
  0.985785535798805       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
