         180           8
   18.7301417984446        18.0860861410912        17.5115650830997     
   16.8943386166180        16.2430797520316        15.6049472198131     
   14.9742568035139        14.3221593341232     
  -2.59494910879072       -2.82473951345947       -2.91897945571860     
  -2.97624955463654       -3.10981058653054       -3.31254387482786     
  -3.53821642053390       -3.82996643490743     
 -2.130726978648856E-002  0.000000000000000E+000
   1.01151072619135       0.000000000000000E+000
   1.01646965734338       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
