         180           3
  -16.1284737049698       -18.1519409107446       -20.3182966156369     
   3.52041704857163        3.08577926352439        3.06294655212648     
  5.017423312624861E-003  0.000000000000000E+000
  0.988563609753705       0.000000000000000E+000
  0.985996792626707       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
