         180           3
  -16.2217332758054       -18.2856830591276       -20.4321413398130     
   3.45164482119671        3.08630429080275        2.99076433897767     
  5.053291812943917E-003  0.000000000000000E+000
  0.988933645309416       0.000000000000000E+000
  0.985847277625715       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
