         180           8
   14.7059092401271        14.0523968462958        13.4022225398478     
   12.8010226762200        12.2091932099391        11.6546345694384     
   11.1352135280175        10.7332160610939     
  -1.68142879644130       -1.72755903956095       -1.86485047651336     
  -2.02520269690403       -2.22511238961974       -2.48124937679288     
  -2.74156270306802       -3.03798075660687     
 -2.180763230503379E-002  0.000000000000000E+000
   1.01122880922812       0.000000000000000E+000
   1.01841376027636       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
