         180           8
   9.98990523982822        9.91109796647837        9.79284151527579     
   9.81397899238535        9.99490212907928        10.0671154383357     
   10.0143653970152        10.0416337395326     
  -5.94060321437586       -6.34800641720590       -6.84782273875697     
  -7.81324464533473       -8.85326636883317       -9.70620363668899     
  -10.1344671716306       -10.4367193765342     
 -2.133288604945273E-002  0.000000000000000E+000
   1.01064448175602       0.000000000000000E+000
   1.01698519454707       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
