         180           3
  -25.5009002386808       -23.8599048545142       -22.3736419076972     
   5.23410569456065        8.73451002364901        11.4217964146505     
  5.114808156558014E-003  0.000000000000000E+000
  0.988522679313862       0.000000000000000E+000
  0.985812414684575       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
