         180           8
  -60.4962120470819       -42.7226760240055       -24.2783423333332     
  -8.82560048041951        4.19078234608770        16.5919821417117     
   25.7704432269569        46.4174627478580     
  -19.6620254622490       -21.7094735692716       -39.5775652246905     
  -44.7868198727890       -43.3939959189441       -47.2953926148933     
  -59.2245861083855       -81.2316318435091     
 -3.592335298314640E-003  0.000000000000000E+000
  0.992926357092701       0.000000000000000E+000
  0.995715239872524       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
