         180           3
  -40.6872104839895       -28.7490394273874       -132.231253354926     
  -32.3423600773875       -129.857552205485       -153.489861508060     
 -1.937469720991049E-003  0.000000000000000E+000
  0.984802629978699       0.000000000000000E+000
  0.980706122441498       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
