         180           8
  -5.97033824477818        7.18488451905370        30.7575941392904     
   38.8657949697068        41.5997885424129        41.1876298186095     
   29.7250092217567        6.26213478234539     
  -15.8025827142753       -23.1186471574326       -26.0152340440162     
  -21.6136044887136       -18.4394207003348       -16.7668078463986     
  -14.6492022607137       -14.5277710338166     
 -4.409900836754137E-002  0.000000000000000E+000
  0.927669144635068       0.000000000000000E+000
  0.956130683089878       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
