         180           8
   33.9203396982963        33.4786524291387        32.8575048177354     
   32.2077447243106        31.5558704694753        31.0346943712501     
   30.8067296447165        30.4800037832396     
  -19.9673142469656       -20.2853503244531       -20.4939755617423     
  -20.6818632430878       -21.0284927839634       -21.2275677007336     
  -21.2048505909900       -21.1052022663825     
 -2.224443919759966E-003  0.000000000000000E+000
  0.984657374379616       0.000000000000000E+000
  0.980271575062019       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
