         180           8
   38.3917139207011        37.5951289270521        36.8893284987390     
   36.1281040467662        35.3585827929166        34.6515663716875     
   34.1235256644047        33.5830957845172     
  -29.5504416016517       -29.3084946116407       -29.2891862329980     
  -29.2026292489004       -29.2425840004058       -29.2119509195932     
  -29.0313109235457       -28.7942506920042     
 -3.942248834598693E-002  0.000000000000000E+000
  0.924531774264323       0.000000000000000E+000
  0.932064463895088       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
