         180           8
  -182.997220898346       -213.649048412083       -208.707257058848     
  -245.549286974405       -308.750667922294       -313.175146417123     
  -281.429267394535       -269.235350128192     
  -145.422029236585       -42.5715742537806        3.36482029099977     
   7.16611577191424        6.09611562621187       -11.6183400721712     
  -70.1301665918008       -90.9131603686757     
 -1.668432752148402E-003  0.000000000000000E+000
  0.985297543214460       0.000000000000000E+000
  0.982999409900523       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
