         180           8
   49.4287488834039        55.8115419210881        35.8219501993085     
  -4.94003088215922       -13.0971791386081      -0.921121103996157     
   2.72871630164056        427.075383773329     
  -44.7940571379003       -26.3276733856430       -18.3920492074510     
  -16.5313438984427       -13.1207080419887      -0.939643336362961     
  -27.1337687030218       -609.549911349014     
 -4.064943859425077E-002  0.000000000000000E+000
  0.930735640770130       0.000000000000000E+000
  0.936458803346808       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
