         180           8
  -3.41406475041769       -4.15930437300378       -4.91720648860036     
  -5.74689325649871       -6.52024542920150       -7.26124932044208     
  -7.99345276634536       -8.86755781340457     
  -9.89290076604014       -10.0000561194625       -9.96515078387012     
  -9.99957242978957       -10.0765458200536       -10.1304931469225     
  -10.1198166661051       -10.0036071689682     
  1.727751266579260E-002  0.000000000000000E+000
  0.996405179653175       0.000000000000000E+000
  0.993914894716447       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
