         180           8
   4.06184653044537        2.92796638283923        2.01546120818709     
   1.09306952672034       0.246578706541364      -0.578023259234495     
  -1.37526567279752       -2.09927148381378     
   10.2683288021582        10.2355575823216        10.1392939365839     
   10.0114023259689        9.76942888752676        9.50277118873874     
   9.23379169165885        8.91180239849885     
  2.384103238218503E-002  0.000000000000000E+000
  0.977417770351760       0.000000000000000E+000
  0.978074158552230       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
