         180           8
   4.08423911280678        2.92433458901963        1.95262572577583     
   1.04272150441476       0.206122339804486      -0.624398757001671     
  -1.40704811770211       -2.24021193611744     
   10.2350416619173        10.1341470285181        10.0542991025573     
   9.86785933500486        9.59641872725894        9.34610620972013     
   9.10085188714403        8.79526790589204     
  2.381260318406435E-002  0.000000000000000E+000
  0.977193997230196       0.000000000000000E+000
  0.978390587779086       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
