         180           8
   4.03853006422642        2.98640733355562        1.97762216556604     
   1.05653056595791       0.192110022342996      -0.623157398619271     
  -1.40336676207859       -2.09823461738074     
   10.3528605426556        10.2128298124065        10.0704227753468     
   9.87673872879501        9.61792928822499        9.34124047731171     
   9.07681647337562        8.77160699057089     
  2.377642204041177E-002  0.000000000000000E+000
  0.977863118468819       0.000000000000000E+000
  0.978212432834101       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
