         180           8
   3.46005168682219        3.11866743830620        2.02301471615390     
   1.10450354197573       0.374647228224252      -0.294140442747663     
  -1.08678712411204       -1.79207196589673     
   4.79622718308566        4.49803381935815        4.61480869086273     
   4.60137125717593        4.52455640135225        4.66066957512906     
   4.79779864160149        4.98908120605668     
  2.190445417802124E-002  0.000000000000000E+000
  0.997385604870737       0.000000000000000E+000
  0.998720462006170       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
