         180           8
   4.14960628599974        3.16297374615683        2.18182523882250     
   1.31448374975596       0.461838423605377      -0.380552277667394     
  -1.19189033756894       -2.05359956246060     
   10.4051888807638        10.2451100124429        10.0648382574757     
   9.80477809507442        9.55410758532198        9.29208631722988     
   9.02516921808506        8.72801753333516     
  2.393743135076645E-002  0.000000000000000E+000
  0.977726336286644       0.000000000000000E+000
  0.976748887920178       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
