         180           8
   4.61126838674571        3.48801765432946        2.48031748738817     
   1.60188723249859       0.792083577085974      -4.381297198015423E-002
 -0.807417907261972       -1.63479855387720     
   10.2598655397777        10.0014525646731        9.88706408417274     
   9.62287457370642        9.36003273537509        9.13687772951948     
   8.84213378495127        8.57187812061785     
  2.385592735722155E-002  0.000000000000000E+000
  0.977667024747035       0.000000000000000E+000
  0.977399994165625       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
