         180           3
   4.06320962184379        1.29975595611257       -1.47327025051110     
   4.68061463241352        4.92383471196328        5.08837813170590     
  2.219375386213941E-002  0.000000000000000E+000
  0.997493889359610       0.000000000000000E+000
  0.998309301963404       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
