         180           3
   4.02503196057232        1.17161586703311       -1.50817621958379     
   4.62101676058116        4.80523594886565        4.95795944342210     
  2.230852506690496E-002  0.000000000000000E+000
   1.00037058913491       0.000000000000000E+000
  0.996804436644702       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
