         180           8
   4.50299635156289        3.54719171307125        2.50537412821736     
   1.59943220275601       0.746780226190044      -6.598851185772724E-002
 -0.863004090203865       -1.64462432662208     
   10.7942986387539        10.4171580129776        9.94735187376631     
   9.66030500636610        9.33540345740554        9.04279844650707     
   8.81210032975318        8.58203830969848     
  2.385837318588312E-002  0.000000000000000E+000
  0.977298057813519       0.000000000000000E+000
  0.978273117996729       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
