         180           3
   3.66180727965745       0.940321024742349       -1.84360681820792     
   4.66360407930100        4.97870227058721        4.98414940370691     
  2.194546904719110E-002  0.000000000000000E+000
   1.00089494392808       0.000000000000000E+000
  0.995876082381437       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
