         180           8
   5.13939808949698        4.24664375679169        3.35697315670465     
   2.48368572849086        1.65123401931067       0.838753915041963     
  5.620648188573024E-002 -0.693548070163674     
   8.06093327429529        7.96300086493715        7.82212195578132     
   7.64318074690647        7.40179469087349        7.16144603784967     
   6.91407374590631        6.48882304201081     
  2.376170549346029E-002  0.000000000000000E+000
  0.975728763810210       0.000000000000000E+000
  0.976397327295184       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
