         180           8
   5.59133685266746        4.49209663915843        3.60086820340754     
   2.74363225541553        1.93597298614766        1.10087754234476     
  0.254153113751174      -0.416740154911380     
   7.76328362838078        7.68312919044880        7.47556172020678     
   7.28889792105335        7.07160434535012        6.81427625400277     
   6.59133710450526        6.30593580714037     
  2.377347408604719E-002  0.000000000000000E+000
  0.975808463032876       0.000000000000000E+000
  0.976917175285469       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
