         180           8
   5.81708224016368        4.95192853696114        4.04327081902041     
   3.25447269659366        2.45640873225813        1.59380388692142     
  0.803586850894487      -1.547791201397553E-002
   7.63667875505976        7.40459179162087        7.20947412147055     
   6.96584279597304        6.69745739415934        6.46386423639174     
   6.20691281596677        6.05312379202885     
  2.386317185415412E-002  0.000000000000000E+000
  0.977191113139536       0.000000000000000E+000
  0.975591917637388       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
