         180           8
   5.92671998792168        5.04937635805816        4.06776231871892     
   3.18024512764099        2.32456142146141        1.53726096513412     
  0.737790215750579       3.532978832731927E-002
   7.55662605795720        7.40964407268712        7.14937029500576     
   6.87461116451739        6.62484290774923        6.36550255089255     
   6.12480811705300        5.89672299190808     
  2.381201028774027E-002  0.000000000000000E+000
  0.976348780156845       0.000000000000000E+000
  0.976583724586548       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
