         180           8
   7.09127336047681        5.08810358819392        4.56330387584268     
   3.79772517068723        2.63440158969947        1.95495825198802     
  0.606108150764009       1.386010750002757E-002
   2.45553974872188        2.53930756760677        2.55314454182720     
   2.51920023424683        2.51328958621109        2.53345313398721     
   2.60484666042067        2.70107001433480     
  2.260093107796007E-002  0.000000000000000E+000
   1.00275379698255       0.000000000000000E+000
  0.995031848674324       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
