         180           8
   5.53453794853870        4.84052793581461        4.06603853705555     
   3.34355565339186        2.55640029474969        1.78277669851302     
   1.01124673008134       0.285686712576433     
   2.05815293138585        2.32034106253607        2.31933074367804     
   2.33509618653422        2.33681434280160        2.36371630756500     
   2.50901974340022        2.75956221319420     
  2.224616956220943E-002  0.000000000000000E+000
  0.997151823823260       0.000000000000000E+000
  0.995474680331963       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
