         180           8
   6.03147835967680        5.04183770580426        4.15713553818989     
   3.30132969124660        2.48161195897966        1.69281050534478     
  0.847898613927880       0.213656542164172     
   7.57030255838564        7.35590300987024        7.20915189505140     
   6.97263978181697        6.69509040025573        6.43311987644057     
   6.20001625203879        6.12610063600106     
  3.894482725802059E-002  0.000000000000000E+000
  0.989749661723883       0.000000000000000E+000
  0.966688407127635       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
