         180           8
   6.00641751637446        5.07497191004146        4.25632335197754     
   3.44492179831373        2.57801672375428        1.75080709494556     
   1.05273087532523       0.312810166731674     
   2.03146202778890        2.21616624978083        2.21945559520753     
   2.25868705759709        2.26007717936431        2.24378765837830     
   2.27261931830407        2.26572593518759     
  2.229122280104521E-002  0.000000000000000E+000
  0.996597447949482       0.000000000000000E+000
  0.995882539587578       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
