         180           8
  -4.80860308337801       -7.46320963891094       -8.03889693438448     
  -9.37193779410224       -9.40388083387272       -10.4674434889440     
  -11.2828989468454       -13.1780595238768     
 -0.497187898038142       -1.71984503387019       -1.73238521370498     
  -2.08622035410030       -1.21547857194922       -1.58206214959294     
  -1.15283136165473       -1.66126533746122     
  2.338476981918249E-002  0.000000000000000E+000
   1.01129429614188       0.000000000000000E+000
  0.986449498356955       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
