         180           8
   39.5597986095366        38.5567846455030        37.6660699322791     
   36.8066101752528        35.9824217034321        35.1693370987600     
   34.3522224887088        33.4130194661632     
   10.0905660595755        9.95366628511119        9.79073887015872     
   9.65543397634698        9.53710359615123        9.38450572360586     
   9.21994269916851        9.15405364023004     
  1.627150980218608E-002  0.000000000000000E+000
  0.980800522533012       0.000000000000000E+000
  0.983860939223846       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
