         180           8
   4.69227990208083        3.95234826863740        3.25940003391094     
   2.53346376077278        1.80432573569404        1.07143261704329     
  0.389286631653131      -0.251346506526650     
   9.00303357898074        9.13716570265542        9.28999864707739     
   9.41835457492734        9.51891178469789        9.62851990724423     
   9.69305655452757        9.74934293804317     
  1.594164250203924E-002  0.000000000000000E+000
   1.00407762661750       0.000000000000000E+000
   1.00178106692723       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
