         180           8
   38.8434690999624        38.0120417678994        37.1481070896409     
   36.2954010785979        35.4181351547260        34.5942377973460     
   33.7644246748373        32.9519020653125     
   9.98562053474933        9.91483320239013        9.79904758666082     
   9.64372622475256        9.46231209157173        9.26966609757271     
   9.05099397001405        8.86527118219038     
  1.651547604771198E-002  0.000000000000000E+000
  0.981953257098304       0.000000000000000E+000
  0.983953184409288       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
