         180           8
   39.5155541513457        38.5756267641880        37.6415925389171     
   36.6887845987757        35.7994107827347        34.9109625410767     
   33.9534176406626        33.2755489370913     
   9.58018875878098        9.44034082842171        9.37091546712306     
   9.23945618445358        9.05753250811881        8.91433168675056     
   8.79989203103791        8.68814523283375     
  1.642345748399969E-002  0.000000000000000E+000
  0.981294857148709       0.000000000000000E+000
  0.984757350478477       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
