         180           8
   8.16100146512882        7.62045145302153        7.15287820992297     
   6.72182923708450        6.36168308598864        5.96304248450569     
   5.50712686844619        5.06389149637013     
   4.49159535058342        4.54833127967859        4.55323800740091     
   4.63584599848763        5.06013341396675        5.62118027117588     
   6.05218250741543        6.59304716713226     
 -2.552531356646493E-003  0.000000000000000E+000
   1.00191706993000       0.000000000000000E+000
  0.998486348647566       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
