         180           8
  -3.30059598751755       -3.71701803218423       -4.06434307775413     
  -4.40729695383033       -4.74287174554856       -5.00361683987226     
  -5.20410146086462       -5.32268320525601     
   3.91131419167351        3.72949632491638        3.53403690017030     
   3.36154254537416        3.25315374610404        3.13636465230564     
   3.07695900974463        3.06549420520578     
 -2.655032601530577E-003  0.000000000000000E+000
  0.991705526645242       0.000000000000000E+000
  0.994668412723007       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
