         180           8
  -3.72770456189341       -4.16673587258834       -4.55807124818987     
  -4.90642815752391       -5.18241110754692       -5.40505846921515     
  -5.59611294359330       -5.67392062199706     
   3.64349550773585        3.47985604656589        3.33834166481181     
   3.18054838103540        3.03575919240887        2.93957010850445     
   2.77895754467730        2.77745200339021     
 -2.825273666332567E-003  0.000000000000000E+000
  0.991599148495000       0.000000000000000E+000
  0.994775106353254       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
